Line 57, 0 - 200 km

2020 2021 2022

2023 2024 2025

25 25.2 25.4 25.6 25.8 26 26.2 26.4 26.6 26.8

Potential Density (kg/m^3)

-5 -4 -3 -2 -1 0 1 2 3 4 5

Anomaly of fl