2014 2015 2016

2017 2018 2019 2020

2021 2022 2023 2024 2025

-4

-3

-2

-1

0

1

2

3

4

Oceanic Nino Index ( °C)

Line Trin, 190 m, 0 - 200 km

Line Tr Oceanic Nino Index -0.01

-0.008

-0.006

-0.004

-0.002

0

0.002

0.004

0.006

0.008

0.01

Anomaly of Geostrophic Velocity (m/s)