Line Trin, winter

25

25

25

26

26

26

0 50 100 150 200 250 300 350 400 450 Offshore Distance (km)

0

50

100

150

200

250

300

350

400

450

500

Depth (m)

25

30

35

40

45

50

55

60

65

CDOM Colored Dissolved Organic Matter